         180           8
  0.237625005865147      -0.194718480321156      -0.568463434181510     
 -0.932251570284605       -1.23481636745664       -1.47041525303798     
  -1.64494567146378       -1.68600388482216     
  -10.9406864264140       -11.3814759486365       -11.9114167269849     
  -12.4017608655313       -12.7991096481048       -13.1202497642656     
  -13.4351372822857       -13.6286383266081     
  5.176576484617530E-004  0.000000000000000E+000
  0.992067580254947       0.000000000000000E+000
  0.994984711295447       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
