         180           8
  0.449796561361781       0.291325034384170       8.754287755834660E-002
 -0.120271468249143      -0.287142002755931      -0.433266743314001     
 -0.644083581267214      -0.721066198062108     
  -9.85876455069365       -9.61436171860658       -9.25395164278126     
  -8.86970357505754       -8.42276487850306       -7.99977107640702     
  -7.57332641485508       -7.19745811805510     
  8.169350781325283E-004  0.000000000000000E+000
  0.991604099456139       0.000000000000000E+000
  0.994554432942908       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
