         180           3
   5.58198191816380        7.39266083480120        9.51213821761841     
   22.6145765081022        23.3725403066055        24.2187323049149     
 -1.809664280871852E-003  0.000000000000000E+000
   1.00122025040394       0.000000000000000E+000
  0.998524682961663       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
