         180           3
   5.98411904448877        7.52764433877925        9.34271833921978     
   21.5667552005047        22.2704337474019        22.9970651077597     
 -1.674121356312610E-003  0.000000000000000E+000
   1.00131141271518       0.000000000000000E+000
  0.998408451463651       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
