         180           8
  0.434646484031612       0.148638673842824      -9.554632361431337E-003
 -0.159437630110578      -0.328959406605239      -0.469212906801963     
 -0.595423726196946      -0.659114291541587     
  -9.94301205807203       -9.74620287121930       -9.41650209656250     
  -9.02749304311823       -8.60076169850287       -8.21747205006523     
  -7.83140940948091       -7.45266438274397     
  8.076253173141239E-004  0.000000000000000E+000
  0.991476503359915       0.000000000000000E+000
  0.994378004479204       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
