         180           3
   5.99261215997102        7.57409143836535        9.41893703937266     
   21.5427270445870        22.3411650021620        23.0787860403578     
 -1.720440597659238E-003  0.000000000000000E+000
   1.00128003874248       0.000000000000000E+000
  0.998370078494421       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
