         180           8
  0.411705687323087       0.262557346708982       9.850081702735071E-002
 -6.686344222819020E-002 -0.238872098281367      -0.411877280267258     
 -0.532202238227518      -0.757750491618676     
  -9.93094256739360       -9.79050931090802       -9.43290699771777     
  -9.06139366064895       -8.65345524055950       -8.23560506865062     
  -7.79016890031940       -7.44740679400270     
  8.092110353521227E-004  0.000000000000000E+000
  0.991488650508381       0.000000000000000E+000
  0.994385309331876       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
