         180           8
  0.488754242459274       0.211132396415962       6.571376940818281E-002
 -8.957948457276914E-002 -0.289867146582921      -0.456721074672807     
 -0.575301126539102      -0.698897265233845     
  -10.1572435931499       -9.84632594172193       -9.54332813635139     
  -9.15142476343284       -8.68840119579012       -8.26921912581285     
  -7.89840640333550       -7.49532286178881     
  7.916084841474448E-004  0.000000000000000E+000
  0.991564431781154       0.000000000000000E+000
  0.994481834216927       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
