         180           3
   5.74108917380895        7.31592354010204        9.17548868784743     
   21.9685914204536        22.4689982706719        23.2130457156800     
 -1.732128372220469E-003  0.000000000000000E+000
   1.00123020652918       0.000000000000000E+000
  0.998476033235211       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
