         180           8
 -0.853816305819208       -1.13849781008471       -1.46070148247907     
  -1.80859359946969       -2.05587670558455       -2.25376311152098     
  -2.40786459739539       -2.50235495748569     
  -9.67888711552948       -10.1112977546373       -10.3160186001202     
  -10.5504116343406       -10.8102753628901       -11.0449805529609     
  -11.2752798433654       -11.6303431976332     
  9.964150333028031E-004  0.000000000000000E+000
  0.990890955109205       0.000000000000000E+000
  0.993930628893343       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
