         180           8
  -1.01402766762733       -1.28072096095325       -1.61326219253433     
  -1.93243249688505       -2.13634229604001       -2.30852317686617     
  -2.47450333751548       -2.57847431100534     
  -9.88638485610042       -10.3292340190542       -10.6107316285002     
  -10.8829851772460       -11.1079287727280       -11.4258127745330     
  -11.7181694647057       -12.0766114461715     
  9.884348348592820E-004  0.000000000000000E+000
  0.990639717342648       0.000000000000000E+000
  0.993881850100888       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
