         180           8
 -0.914706658611410       -1.31406638903434       -1.61469369918367     
  -1.90795844152190       -2.23126338533509       -2.50276851447687     
  -2.62091915188904       -2.69224325879292     
  -10.1071438209908       -10.3042860738521       -10.5463033258702     
  -10.8118728617562       -11.1095645973850       -11.4408154950061     
  -11.7807811412211       -12.0372222235102     
  8.838868087973624E-004  0.000000000000000E+000
  0.990905660688429       0.000000000000000E+000
  0.994021269927423       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
