         180           3
   5.92424055383223        4.06242419814622        2.81957645318591     
   22.3262632035816        22.4359256327027        22.7524229417027     
 -1.656839647780149E-003  0.000000000000000E+000
   1.00094659008846       0.000000000000000E+000
  0.998033020192344       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
