         180           8
  -1.01177939222814       -1.38992739569489       -1.73675537678565     
  -2.02951539264614       -2.30610175503393       -2.49662968762161     
  -2.60141979995426       -2.80697379518416     
  -9.98860846448675       -10.2968502540636       -10.6140300934573     
  -10.8568521634948       -11.0774754335194       -11.3111716818138     
  -11.5962564202979       -11.8383118848335     
  8.304006140181546E-004  0.000000000000000E+000
  0.991256563202893       0.000000000000000E+000
  0.994112289728366       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
