         180           8
 -0.485277964949480      -0.873483722163499       -1.18561396691532     
  -1.54333224321094       -1.81892295099892       -2.06774834188175     
  -2.26766759902574       -2.41963310848291     
  -10.6367650076237       -11.0184644788145       -11.5440262037774     
  -11.9762939634010       -12.2730931039560       -12.5564063539147     
  -12.8775215624363       -13.0193404854356     
  6.708259532942939E-004  0.000000000000000E+000
  0.991752193990795       0.000000000000000E+000
  0.994455186621932       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
