         180           3
   5.65619318116785        3.64358531989000        2.32815140157567     
   21.5310964451617        21.7166188502731        22.0720061950603     
 -1.698259844035158E-003  0.000000000000000E+000
   1.00110392582630       0.000000000000000E+000
  0.998186638133915       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
