         180           8
 -0.402688937664165      -0.777235864264971       -1.10071453300325     
  -1.40676495157469       -1.66875705950282       -1.90139733731788     
  -2.01841202724307       -2.17669907000628     
  -10.0999801237292       -10.6609308437698       -10.9860347811783     
  -11.2006475202647       -11.4344159657374       -11.7317190619432     
  -11.9975507865100       -12.2450091535320     
  7.291508199856200E-004  0.000000000000000E+000
  0.991532249131047       0.000000000000000E+000
  0.994311964049443       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
