         180           3
   5.32304367878297        3.45696025822209        2.19356740769598     
   21.4254829740831        21.7363629176222        21.9389375901716     
 -1.674612029551910E-003  0.000000000000000E+000
   1.00114685593699       0.000000000000000E+000
  0.998506689934296       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
