         180           8
 -1.142988362932060E-002 -0.413966529554386      -0.759280102756574     
  -1.09216750560011       -1.39148655213359       -1.61929595663760     
  -1.79231869370527       -1.91557939543026     
  -10.1850858459629       -10.4851289578841       -10.7858340672188     
  -11.0694036989730       -11.3717063143279       -11.6840277576815     
  -12.0259883440395       -12.2773088377476     
  6.444556357801056E-004  0.000000000000000E+000
  0.991732937764824       0.000000000000000E+000
  0.994669044986789       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
