         180           8
 -0.446123129362959      -0.787092414348038       -1.12581403383571     
  -1.43344423923796       -1.73484668949769       -1.95542807317325     
  -2.06737125952605       -2.29661975244628     
  -10.3802544221697       -10.6911584398932       -10.9750234529660     
  -11.2810520035807       -11.5499889567242       -11.7529214682199     
  -12.0426466550038       -12.2162864207465     
  6.261061220262501E-004  0.000000000000000E+000
  0.991734780589933       0.000000000000000E+000
  0.994726633033462       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
