         180           8
 -0.537503321382388      -0.879584466982602       -1.20973457803710     
  -1.49525006307588       -1.79292398228884       -2.03282540585308     
  -2.15546313397156       -2.33393312139024     
  -10.1763612920970       -10.5604729444442       -10.8149024245406     
  -11.0989237839928       -11.3652228555677       -11.6480522607847     
  -11.9422405624445       -12.2008423568471     
  5.613882605884346E-004  0.000000000000000E+000
  0.991893121543112       0.000000000000000E+000
  0.994790139401181       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
