         180           3
   5.30160298575167        3.27094663351000        1.95407044487827     
   22.1519597283773        21.5619576964276        22.4919620249692     
 -1.672022672898762E-003  0.000000000000000E+000
   1.00123107821227       0.000000000000000E+000
  0.998572882884496       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
