         180           8
  0.181086730013930      -0.223979988854668      -0.525780576507988     
 -0.858357250996915       -1.19204607474361       -1.43825445404173     
  -1.62544455975838       -1.81144649287439     
  -9.51802466773913       -9.80883894139656       -10.0403632125910     
  -10.2371174803411       -10.4618883577671       -10.6758276692949     
  -10.8877081642207       -11.2172294680962     
  8.613540600566960E-004  0.000000000000000E+000
  0.991618967564089       0.000000000000000E+000
  0.994620056883435       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
