         180           8
 -0.740782995084198       -1.02671239360794       -1.34170053854399     
  -1.66277738432053       -1.89396761435204       -2.09013449607943     
  -2.28840167277663       -2.42184715203052     
  -9.02927472079470       -9.41909069985513       -9.71614812503994     
  -10.0012365946013       -10.3068125711448       -10.6190312286827     
  -10.8804306739549       -11.2136433325444     
  7.925713949018409E-004  0.000000000000000E+000
  0.991675247411086       0.000000000000000E+000
  0.994604969918356       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
