         180           3
   5.98424780763990        4.00755375807319        2.56866630913383     
   22.3453565961449        22.6093564339300        22.8974380469811     
 -1.704054287703979E-003  0.000000000000000E+000
   1.00109013705819       0.000000000000000E+000
  0.998518937146499       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
