         180           8
 -0.768075025059980       -1.12522413617152       -1.45763481913419     
  -1.76233569201255       -2.00264527220800       -2.18157710707257     
  -2.34164909098894       -2.40595920310749     
  -9.17484310476756       -9.55894367161178       -9.81938287489466     
  -10.0730519270067       -10.3263484123521       -10.6279358645998     
  -10.9064101533126       -11.1757617191156     
  7.742934407708418E-004  0.000000000000000E+000
  0.991652168769781       0.000000000000000E+000
  0.994587598939097       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
