         180           3
   5.86645793202114        3.90168271783918        2.48068715610541     
   22.3471406504030        22.6304906172656        22.7177199773453     
 -1.662188575374894E-003  0.000000000000000E+000
   1.00114155397789       0.000000000000000E+000
  0.998642787542708       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
