         180           8
 -0.524544462858485      -0.854620506093041       -1.19049192200269     
  -1.52267222594233       -1.80606601689933       -2.02790503574093     
  -2.17803323741280       -2.37184572308056     
  -9.22795032484220       -9.52157821139401       -9.78333138062365     
  -10.0233230359489       -10.2898582488136       -10.5773606515811     
  -10.8501713738676       -11.1631171599596     
  7.943923544716175E-004  0.000000000000000E+000
  0.991567504809649       0.000000000000000E+000
  0.994674908276625       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
