         180           8
 -0.632407746787827       -1.00182314539738       -1.29872873177371     
  -1.61339916892291       -1.88287658006488       -2.08048066879205     
  -2.22761317802999       -2.44368860155630     
  -9.12364097323551       -9.59725227215393       -9.84130576793034     
  -10.0901329567009       -10.3683671670602       -10.6552132147359     
  -10.9396185426123       -11.2264015859377     
  8.580535106338738E-004  0.000000000000000E+000
  0.991529374722694       0.000000000000000E+000
  0.994618999380643       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
