         180           8
 -0.371582415017353      -0.713521968096547       -1.02975030282998     
  -1.34904238697076       -1.68070892014767       -1.94141448432987     
  -2.12509845979156       -2.18532662019120     
  -8.84557110055683       -9.19914510569952       -9.46892498806549     
  -9.91378243148198       -10.6383291338835       -11.1277140996522     
  -11.3862619400596       -11.7004079386051     
  8.214665720781970E-004  0.000000000000000E+000
  0.991686214771220       0.000000000000000E+000
  0.994733483803949       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
