         180           8
 -0.614661961402902       -1.07836768905954       -1.41318687846437     
  -1.74492912553645       -1.98929266279803       -2.21930001657120     
  -2.44255988743685       -2.66025055331660     
  -8.10106822262787       -8.21313525917324       -7.87938131588363     
  -7.67302458339767       -7.56761737675177       -7.47508749628545     
  -7.39622037978546       -7.24399756808098     
  1.207870744266466E-003  0.000000000000000E+000
  0.990860842909946       0.000000000000000E+000
  0.994015578716472       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
