         180           8
 -0.481659985940146      -0.916199832814723       -1.21068271432492     
  -1.53250229393060       -1.83535997751225       -2.06832035030841     
  -2.23385924364327       -2.51216722049134     
  -8.18280662940746       -8.39504745005814       -8.66805962965538     
  -8.87917141307323       -9.11821940059630       -9.32568490959461     
  -9.56843488478423       -9.82945329866857     
  1.191445160510286E-003  0.000000000000000E+000
  0.990821942807186       0.000000000000000E+000
  0.994047562442358       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
