         180           3
   6.71200746192424        4.72816705081737        3.39362301104814     
   23.8399447066333        23.9856513720731        24.1218368473792     
 -1.741287139452005E-003  0.000000000000000E+000
   1.00105535003391       0.000000000000000E+000
  0.998532733279583       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
