         180           8
  -1.61662385529915       -1.90197796623145       -2.22042929666568     
  -2.52513918251676       -2.77783940684401       -2.96676545703455     
  -3.11490793665031       -3.23730151852429     
  -7.79363587159667       -8.18382901119135       -8.49692571310047     
  -8.74578701648042       -9.04362674883810       -9.31641254080516     
  -9.58672422228120       -9.85826297383320     
  1.108210748063802E-003  0.000000000000000E+000
  0.991017549604671       0.000000000000000E+000
  0.994102773677200       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
