         180           8
  -1.47334473585616       -1.87845065213240       -2.18335626170441     
  -2.52594899053596       -2.80343809614302       -3.00720060464244     
  -3.17834815054109       -3.31147828325129     
  -7.78594047296696       -8.13762673625384       -8.41217889246133     
  -8.64963556284900       -8.90959416683750       -9.18936177623756     
  -9.43519835455485       -9.66258207605022     
  1.072380243654010E-003  0.000000000000000E+000
  0.991125953434512       0.000000000000000E+000
  0.994269470085124       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
