         180           8
  -1.64689702113322       -1.96096558400201       -2.27106998237491     
  -2.53427311854943       -2.80554859352750       -3.01286848080310     
  -3.18175939041950       -3.34603647259165     
  -7.82617902521660       -8.16369287758942       -8.42435028774607     
  -8.69280789702198       -9.01236391744221       -9.25196845478846     
  -9.48322186711434       -9.67592526337228     
  1.031788567662423E-003  0.000000000000000E+000
  0.991206181474153       0.000000000000000E+000
  0.994424119002290       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
