         180           3
   5.09026352044900        3.37705751283126        1.82405970890801     
   18.5803616386046        18.8073077025550        19.1370363308634     
 -1.735354206583780E-003  0.000000000000000E+000
   1.00137519180660       0.000000000000000E+000
  0.998390508006183       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
