         180           8
  0.393410415712240       7.751445455498560E-002 -0.258245242368232     
 -0.549095136479233      -0.812489421302729       -1.05230118616732     
  -1.19173625897935       -1.41058358690170     
  -13.2243428045894       -13.6143267087044       -13.9000923068941     
  -14.2121771202338       -14.5066685679690       -14.7372926439565     
  -15.0178557381873       -15.3064010171785     
  3.578396658364183E-004  0.000000000000000E+000
  0.991943721886105       0.000000000000000E+000
  0.994955423833352       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
