         180           8
  0.675324717913111       0.260317023697651      -0.100872948064425     
 -0.427082966151924      -0.738283971668902       -1.00810433360223     
  -1.20771836371934       -1.39727304111480     
  -13.5951639151639       -13.9160292944603       -14.2036632250336     
  -14.4747122464667       -14.7184753108790       -14.9124072871214     
  -15.1520925805113       -15.3384787552740     
  1.816015169040099E-004  0.000000000000000E+000
  0.992194235737382       0.000000000000000E+000
  0.995123639462061       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
