         180           8
  0.722892431041873       0.295198127820882      -4.874061559106648E-002
 -0.385170301555915      -0.695284073323964      -0.953919807016296     
  -1.12022407272942       -1.27956317984444     
  -13.3314926251114       -13.6925550032752       -13.9704156076480     
  -14.2783786653889       -14.6047623029351       -14.8930183498825     
  -15.1958864017479       -15.5008040734798     
  1.193536697279770E-004  0.000000000000000E+000
  0.992370762442603       0.000000000000000E+000
  0.995359927132434       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
