         180           8
  0.991594470605580       0.656174578934923       0.292596886264663     
 -4.638051282764644E-002 -0.369397440504710      -0.659007298734110     
 -0.851272205416254      -0.779711339409460     
  -13.0238832445679       -13.3617947878269       -13.6525422089559     
  -13.9646697295478       -14.5234161047764       -15.2406646869212     
  -15.6648159848103       -16.0365749532947     
  9.579066137192694E-005  0.000000000000000E+000
  0.992609628105138       0.000000000000000E+000
  0.995622865534360       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
