         180           3
   4.50293314873925        6.21737637300701        8.09086902815084     
   18.2275917622698        19.1496665175502        19.7956173110057     
 -1.623830646030847E-003  0.000000000000000E+000
   1.00153189401647       0.000000000000000E+000
  0.998577570758600       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
