         180           8
   1.22734035423073        1.09003575457160       0.913979836963841     
  0.764715862923768       0.618700210856199       0.483520785362383     
  0.356515835042133       0.286974258646528     
  -12.9227088841160       -12.5614925993403       -12.1786844182286     
  -11.7629905158692       -11.3378649698078       -10.9103881640030     
  -10.5034049054541       -10.1162080360572     
  3.054172546920121E-004  0.000000000000000E+000
  0.992322592551465       0.000000000000000E+000
  0.995092021150477       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
