         180           8
   1.39465915515425        1.13237058973647       0.960171100739364     
  0.808470721811883       0.684626318199008       0.523927002761690     
  0.412099686138588       0.135233523751877     
  -12.6597142741161       -12.4302959580740       -12.0925920646153     
  -11.7228732345911       -11.3110131268758       -10.9076535158252     
  -10.4960661579543       -10.0953281099620     
  2.625703483097475E-004  0.000000000000000E+000
  0.992383502617139       0.000000000000000E+000
  0.995174589623097       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
