         180           3
   4.50958999414626        6.16368248425841        8.02094496366300     
   18.4783993791690        19.1851712111710        19.8967397820152     
 -1.706504318356250E-003  0.000000000000000E+000
   1.00155802069533       0.000000000000000E+000
  0.998575791985850       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
