         180           8
   1.43249988277050        1.21198495671990        1.05054091260894     
  0.876389513553252       0.717696568348721       0.582029889755584     
  0.454672392030279       0.276038965561201     
  -12.7494671596014       -12.4871574483009       -12.1121292896032     
  -11.7515474182755       -11.4116809167636       -10.9763518057757     
  -10.4904849973524       -10.1190984144344     
  2.476142842628945E-004  0.000000000000000E+000
  0.992444213754271       0.000000000000000E+000
  0.995214576157829       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
