         180           8
   1.34234346590735        1.13418831886387       0.950340367885128     
  0.801549931352004       0.639885755872589       0.483844530315468     
  0.357764495538895       0.129508814028401     
  -12.6659315239695       -12.3954028935380       -12.0163260523300     
  -11.6423556190741       -11.2490785454219       -10.8425885028995     
  -10.4324015612051       -10.0038091766074     
  1.776656380839257E-004  0.000000000000000E+000
  0.992468692765950       0.000000000000000E+000
  0.995230696435426       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
