         180           3
   4.47956213407594        6.13210593648712        8.02157641931340     
   18.6698724036229        19.3470224394231        20.0212385862058     
 -1.755230935117490E-003  0.000000000000000E+000
   1.00162518401092       0.000000000000000E+000
  0.998557731726464       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
