         180           8
   1.55301554890371        1.25567375758627        1.08193095701613     
  0.900112773790678       0.750171717377142       0.595769832061014     
  0.468669906935502       0.377820037704532     
  -12.6509612110242       -12.4730793519389       -12.1227147061457     
  -11.7357691879474       -11.3263296802008       -10.9155818124347     
  -10.5088573699652       -10.1156155970995     
  1.729356318669164E-004  0.000000000000000E+000
  0.992549273361299       0.000000000000000E+000
  0.995374315774504       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
