         180           8
   1.52386928838952        1.36818444078280        1.16830560572651     
  0.995248330333481       0.835172210643705       0.677861469568011     
  0.571081137021182       0.453121062823495     
  -12.6361423719967       -12.4394677911127       -12.1587553502173     
  -11.8124407304198       -11.3784248766545       -10.9183460814369     
  -10.4912403362482       -10.2126017236263     
  1.606483285452238E-004  0.000000000000000E+000
  0.992682638301616       0.000000000000000E+000
  0.995629597637361       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
